##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################


rpl_ndb_2innodb          : Bug #32648  	Test failure between NDB Cluster and other engines
rpl_ndb_2myisam          : Bug #32648  	Test failure between NDB Cluster and other engines
rpl_ndb_2other           : Bug #32648  	Test failure between NDB Cluster and other engines
rpl_ndb_ddl              : BUG#28798 2007-05-31  lars  Valgrind failure in NDB
rpl_ndb_extraColMaster   : BUG#30854 : Tables name show as binary in slave err msg on vm-win2003-64-b and Solaris
rpl_ndb_mix_innodb       : Bug #32720   Test rpl_ndb_mix_innodb fails on SPARC and PowerPC

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open

#rpl_ndb_dd_advance	 : Bug#25913 rpl_ndb_dd_advance fails randomly
