##############################################################################
#
#  List the test cases that are to be disabled temporarely.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Don't use any TAB characters for whitespace.
#
##############################################################################

user_limits     : Bug#23921 random failure of user_limits.test
im_life_cycle        : Bug#27851: Instance manager test im_life_cycle fails randomly
im_daemon_life_cycle : Bug#20294: Instance manager tests fail randomly
im_options_set       : Bug#20294: Instance manager tests fail randomly
im_options_unset     : Bug#20294: Instance manager tests fail randomly
im_utils             : Bug#20294: Instance manager tests fail randomly
grant_cache          : Bug#32651: grant_cache.test fails
rpl_log              : Bug#32653: rpl_log.test fails randomly
rpl_view             : Bug#32654: rpl_view.test fails randomly
ndb_backup_print     : Bug#32357: ndb_backup_print test fails sometimes in pushbuild
