##############################################################################
#
#  List the test cases that are to be disabled temporarely.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Don't use any TAB characters for whitespace.
#
##############################################################################

ndb_load        : Bug#17233
user_limits     : Bug#23921 random failure of user_limits.test
flush2          : Bug#24805 Pushbuild can't handle test with --disable-log-bin

