##############################################################################
#
#  List the test cases that are to be disabled temporarely.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Don't use any TAB characters for whitespace.
#
##############################################################################

innodb_storedproc: (changes of WL#2984, using storeproc_nn instead)
memory_storedproc: (changes of WL#2984, using storeproc_nn instead)
myisam_storedproc: (changes of WL#2984, using storeproc_nn instead)
ndb_trig_1011ext:  Bug#32656 NDB: Duplicate key error aborts transaction in handler. Doesn't talk back to SQL
is_tables_ndb:     Bug#37198 user without any right on schema sees NDB table
