##############################################################################
#
#  List the test cases that are to be disabled temporarely.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Don't use any TAB characters for whitespace.
#
##############################################################################

innodb_storedproc: switched off (too much changed output from WL#2984, needs to be checked)
memory_storedproc: switched off (too much changed output from WL#2984, needs to be checked)
myisam_storedproc: switched off (too much changed output from WL#2984, needs to be checked)
~
