##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
kill                     : Bug#37780 2008-12-03 HHunger need some changes to be robust enough for pushbuild.
innodb_bug39438          : Bug#42383 2009-01-28 lsoares "This fails in embedded and on windows.  Note that this test is not run on windows and on embedded in PB for main trees currently"
query_cache_28249        : Bug#43861 2009-03-25 main.query_cache_28249 fails sporadically
init_connect             : Bug#44920 2009-07-06 pcrews MTR not processing master.opt input properly on Windows.  *Must be done this way due to the nature of the bug*

