2952: tokutek not_5_5
4472 : #4521 MDL for alter table in 5.5 prohibits this test from having any chance of working
fileops-2: tokutek not_5_5
fileops-3: tokutek not_5_5
fileops-4: tokutek not_5_5
memcache_dirty: tokutek FB port
xa-2: tokutek not_5_5
tokudb_drop_part_table_668: upgrade from tokudb 6.6.8
tokudb_drop_simple_table_668: upgrade from tokudb 6.6.8
checkpoint_lock_2: test can not work when the checkpoint_safe_lock is a fair rwlock
6053: tokudb is not the default storage engine
1883: tokutek's auto inc singleton patch missing
3083: no patch to find_shortest_key to prefer PK over CK
db768 : https://tokutek.atlassian.net/browse/DB-768
dict_leak_3518 : https://tokutek.atlassian.net/browse/DB-635
1872 : https://tokutek.atlassian.net/browse/DB-750
