##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

GCF-1018B : MDEV-21613 galera_sr.GCF-1018B MTR failed: Failed to open table mysql.wsrep_streaming_log for writing
GCF-1043A : MDEV-21170 Galera test failure on galera_sr.GCF-1043A
GCF-1060 : MDEV-20848 galera_sr.GCF_1060
galera-features#56 : MDEV-18542 galera_sr.galera-features#56

