##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
binlog_truncate_innodb	: BUG#11764459 2010-10-20 anitha Originally disabled due to BUG#42643. Product bug fixed, but test changes needed
binlog_spurious_ddl_errors  : BUG#11761680 2010-06-03 alik binlog_spurious_ddl_errors.test fails, thus disabled
