##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

GAL-501 : MDEV-24645 galera_3nodes.GAL-501 MTR failed: failed to open gcomm backend connection: 110
GCF-354 : MDEV-25614 Galera test failure on GCF-354
galera_gtid_2_cluster : MDEV-23775 Galera test failure on galera_3nodes.galera_gtid_2_cluster
galera_ist_gcache_rollover : MDEV-23578 WSREP: exception caused by message: {v=0,t=1,ut=255,o=4,s=0,sr=0,as=1,f=6,src=50524cfe,srcvid=view_id(REG,50524cfe,4),insvid=view_id(UNKNOWN,00000000,0),ru=00000000,r=[-1,-1],fs=75,nl=(}
galera_load_data_ist :  MDEV-24639 galera_3nodes.galera_load_data_ist MTR failed with SIGABRT: query 'reap' failed: 2013: Lost connection to server during query
galera_load_data_ist :  MDEV-24639 galera_3nodes.galera_load_data_ist MTR failed with SIGABRT: query 'reap' failed: 2013: Lost connection to server during query
galera_safe_to_bootstrap : MDEV-24097 galera_3nodes.galera_safe_to_bootstrap MTR sporadaically fails: Failed to start mysqld or mysql_shutdown failed
galera_slave_options_do : MDEV-8798
galera_slave_options_ignore : MDEV-8798
galera_vote_rejoin_mysqldump : MDEV-24481: galera_3nodes.galera_vote_rejoin_mysqldump MTR failed: mysql_shutdown failed
