alter_tablespace     : Not supported
autoinc_secondary    : Not supported
create_table         : MDEV-12914 - Engine for temporary tables which are implicitly created as RocksDB is substituted silently
delete_low_prio      : Not supported
foreign_keys         : Not supported
fulltext_search      : Not supported
handler              : Not supported
index_enable_disable : Not supported
insert_delayed       : Not supported
insert_high_prio     : Not supported
insert_low_prio      : Not supported
lock                 : MDEV-13148 - LOCK TABLE on RocksDB table fails with a bogus error message
lock_concurrent      : MDEV-13148 - LOCK TABLE on RocksDB table fails with a bogus error message
optimize_table       : MDEV-13148 - LOCK TABLE on RocksDB table fails with a bogus error message
repair_table         : MDEV-13148 - LOCK TABLE on RocksDB table fails with a bogus error message
select_high_prio     : Not supported
show_engine          : SHOW ENGINE produces different number of lines depending on previous tests
show_table_status    : MDEV-13152 - Indeterministic row number in SHOW TABLE STATUS on RocksDB table
tbl_opt_data_dir     : Not supported
tbl_opt_index_dir    : Not supported
type_binary_indexes  : MDEV-16387 - Wrong execution plan
type_spatial         : Not supported
type_spatial_indexes : Not supported
update_low_prio      : Not supported
update_ignore        : MDEV-13151 - Indeterministic results of multi-table update on RocksDB tables
update_multi         : MDEV-13151 - Indeterministic results of multi-table update on RocksDB tables
vcol                 : Not supported
