##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_row_create_table : Bug#11759274 Feb 27 2010 andrei failed different way than earlier with bug#45576
rpl_get_master_version_and_clock : Bug#11766137 Jan 05 2011 joro Valgrind warnings rpl_get_master_version_and_clock
rpl_row_until : BUG#59543 Jan 26 2011 alfranio Replication test from eits suite rpl_row_until times out
rpl_stm_until : BUG#59543 Jan 26 2011 alfranio Replication test from eits suite rpl_row_until times out
