##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
ndb_autodiscover         : BUG#11745709 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_autodiscover2        : BUG#11745709 2006-02-16 jmiller Needs to be fixed w.r.t binlog

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open
#ndb_autodiscover3        : bug#21806
#ndb_autodiscover3         : Bug#20872 2007-07-15 ingo master*.err: miscellaneous error messages
#rpl_ndb_extraColMaster   : BUG#30854 : Tables name show as binary in slave err msg on vm-win2003-64-b and Solaris
#rpl_ndb_mix_innodb       : Bug #32720   Test rpl_ndb_mix_innodb fails on SPARC and PowerPC
#rpl_ndb_dd_advance	 : Bug #30222  	rpl_ndb_dd_advance.test fails
