##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
ndb_dd_sql_features      : Bug#29102 ndb_dd_sql_features fails in pushbuild
ndb_load                 : BUG#17233 2006-05-04 tomas failed load data from infile causes mysqld dbug_assert, binlog not flushed

partition_03ndb          : BUG#16385 2006-03-24 mikael Partitions: crash when updating a range partitioned NDB table

ndb_partition_error2	 : HF is not sure if the test can work as internded on all the platforms

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open
#ndb_binlog_ddl_multi     : BUG#18976 2006-04-10 kent    CRBR: multiple binlog, second binlog may miss schema log events
#ndb_binlog_discover      : bug#21806 2006-08-24
