##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
kill                     : Bug#37780 2008-12-03 HHunger need some changes to be robust enough for pushbuild.
innodb_bug39438          : BUG#42383 2009-01-28 lsoares "This fails in embedded and on windows.  Note that this test is not run on windows and on embedded in PB for main trees currently"
#concurrent_innodb_safelog: disabled for embedded server due to bug#43733 Select on processlist let the embedded server crash (concurrent_innodb_safelog).
#concurrent_innodb_unsafelog: disabled for embedded server due to bug#43733.
