##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
user_limits     : Bug#23921 random failure of user_limits.test

im_options                : Bug#20294 2006-07-24 stewart   Instance manager test im_options fails randomly
concurrent_innodb        : BUG#21579 2006-08-11 mleich innodb_concurrent random failures with varying differences
ndb_autodiscover         : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_autodiscover2        : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_load                 : BUG#17233 2006-05-04 tomas failed load data from infile causes mysqld dbug_assert, binlog not flushed
ndb_restore_partition    : Problem with cluster/def/schema table that is in std_data/ndb_backup51; Pekka will schdule this to someone
rpl_ndb_sync             : Problem with cluster/def/schema table that is in std_data/ndb_backup51; Pekka will schdule this to someone

partition_03ndb          : BUG#16385 2006-03-24 mikael Partitions: crash when updating a range partitioned NDB table
ps_7ndb                  : BUG#18950 2006-02-16 jmiller create table like does not obtain LOCK_open
rpl_ndb_2innodb          : BUG#19227 2006-04-20 pekka pk delete apparently not replicated
rpl_ndb_2myisam          : BUG#19227 Seems to pass currently
rpl_ndb_dd_partitions    : BUG#19259 2006-04-21 rpl_ndb_dd_partitions fails on s/AMD
rpl_ndb_ddl              : BUG#18946 result file needs update + test needs to checked
rpl_ndb_innodb2ndb       : Bug #19710  Cluster replication to partition table fails on DELETE FROM statement
rpl_ndb_myisam2ndb       : Bug #19710  Cluster replication to partition table fails on DELETE FROM statement
rpl_row_blob_innodb      : BUG#18980 2006-04-10 kent    Test fails randomly
rpl_multi_engine         : BUG#22583 2006-09-23 lars
synchronization          : Bug#24529  	Test 'synchronization' fails on Mac pushbuild; Also on Linux 64 bit.

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open
#ndb_binlog_ddl_multi     : BUG#18976 2006-04-10 kent    CRBR: multiple binlog, second binlog may miss schema log events
ndb_binlog_discover      : bug#21806 2006-08-24
ndb_autodiscover3        : bug#21806

flush2                   : Bug#24805 Pushbuild can't handle test with --disable-log-bin
mysql_upgrade            : Bug#25074 mysql_upgrade gives inconsisten results

