##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

innodb_scrub            : MDEV-8139 scrubbing does not work reliably
innodb_scrub_background : MDEV-8139 scrubbing does not work reliably
innodb-redo-badkey      : MDEV-13893/MDEV-12699 fix recovery of corrupted pages
