##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

sp-goto         : GOTO is currently is disabled - will be fixed in the future
rpl_bit_npk     : Bug #13418
events          : Test case instability - infinite locking. To be fixed.
func_group      : Bug #15448
func_math       : Bug #15448
group_min_max   : Bug #15448 
innodb_concurrent : Results are not deterministic, Elliot will fix (BUG#3300)
subselect       : Bug#15706
ps_7ndb         : dbug assert in RBR mode when executing test suite
rpl_ddl         : Bug#15963 SBR does not show "Definer" correctly
partition_03ndb : Bug#16385
ndb_binlog_basic   : Results are not deterministic, Tomas will fix
rpl_ndb_basic   : Bug#16228
rpl_sp          : Bug #16456
ndb_dd_disk2memory : Bug #16466 & 16736
ndb_autodiscover : Needs to be fixed w.r.t binlog
ndb_autodiscover2 : Needs to be fixed w.r.t binlog
system_mysql_db : Needs fixing
system_mysql_db_fix : Needs fixing
