##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
sizing_off: not updated for 10.0 yet
sizing_med: not updated for 10.0 yet
sizing_low: not updated for 10.0 yet
sizing_high: not updated for 10.0 yet
sizing_growth: not updated for 10.0 yet
sizing_default: not updated for 10.0 yet

binlog_edge_mix: needs slave_relay_log_info
binlog_edge_row: needs slave_relay_log_info
binlog_edge_stmt: needs slave_relay_log_info
binlog_ok_mix: needs slave_relay_log_info
binlog_ok_row: needs slave_relay_log_info
binlog_ok_stmt: needs slave_relay_log_info
