##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
kill                     : Bug#37780 2008-12-03 HHunger need some changes to be robust enough for pushbuild.
query_cache_28249        : Bug#43861 2009-03-25 main.query_cache_28249 fails sporadically
sp_sync                  : Bug#48157 2010-02-06 5.5-m3 demands a differnt solution
innodb-autoinc           : Bug#49267 2009-12-02 test fails on windows because of different case mode
innodb                   : Bug#49396 2009-12-03 test fails in embedded mode
plugin_load              : Bug#42144 2009-12-21 alik plugin_load fails
