##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open
rpl_ndb_2ndb   : Bug#45974: rpl_ndb_2ndb fails sporadically
