##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
events_bugs             : test case unstable (race conditions). andrey will fix
events_stress           : test case unstable. andrey will fix
events                  : test case unstable. andrey will fix
#ndb_alter_table_row    : sometimes wrong error 1015!=1046
ndb_autodiscover        : Needs to be fixed w.r.t binlog
ndb_autodiscover2       : Needs to be fixed w.r.t binlog
#ndb_binlog_basic        : Results are not deterministic, Tomas will fix
ndb_binlog_ddl_multi    : Bug #18490 cluster: binlog events lost on remote mysqld (asynchronous)
#ndb_binlog_multi        : Results are not deterministic, Tomas will fix
ndb_load                : Bug#17233
partition_03ndb         : Bug#16385
ps_7ndb                 : dbug assert in RBR mode when executing test suite
#rpl_bit_npk             : Bug#13418
#rpl_ddl                 : Bug#15963 SBR does not show "Definer" correctly
rpl_ndb_2innodb         : assertion in get_parts_for_update()
rpl_ndb_2myisam         : assertion in get_parts_for_update()
rpl_ndb_auto_inc        : Bug#17086
#rpl_ndb_basic           : Bug#16228 [IN REVIEW]
#rpl_ndb_blob            : interferes with following tests, causing hang
#rpl_ndb_blob2           : interferes with following tests, causing hang
rpl_ndb_ddl             : master hangs
#rpl_ndb_delete_nowhere  : Bug#17400: delete & update of rows in table without pk fails
rpl_ndb_innodb2ndb      : Bug#18261: Cluster Replication: tests rpl_ndb_xxx2ndb fails
rpl_ndb_myisam2ndb      : Bug#18261: Cluster Replication: tests rpl_ndb_xxx2ndb fails
rpl_ndb_log             : result not deterministic, TBD if should remove
rpl_ndb_relay_space     : Bug#16993
#rpl_ndb_multi_update3   : Bug#17400: delete & update of rows in table without pk fails
rpl_ndb_sp007           : Bug #18565
rpl_row_inexist_tbl     : Disabled since patch makes this test wait forever
rpl_sp                  : Bug#16456
rpl_until               : Unstable test case, bug#15886
sp-goto                 : GOTO is currently is disabled - will be fixed in the future
mysqldump               : BUG#18078
udf             : Bug#18564 (Permission by Brian)
