##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

binlog_truncate_innodb	    : BUG#42643 2009-02-06 mats Changes to InnoDB requires to complete fix for BUG#36763
binlog_unsafe               : BUG#50312 2010-01-13 lsoares Warnings for unsafe sub-statement not returned to client
binlog_spurious_ddl_errors  : BUG#54195 2010-06-03 alik binlog_spurious_ddl_errors.test fails, thus disabled
