##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

foreign_key : Sporadic failure "WSREP has not yet prepared node for application use"
variables : MDEV-19746 Galera test failures because of wsrep_slave_threads identification
