##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_redirect               : Failure is sporadic and and the test is superfluous (mats)
rpl_innodb_bug28430        : Failure on Solaris Bug #36793
rpl_temporary              : BUG#38269 2008-07-21 Sven valgrind error in pushbuild
rpl_flushlog_loop          : BUG#37733 2008-07-23 Sven disabled in 5.1-bugteam. the bug has been fixed in 5.1-rpl: please re-enable when that gets pushed to main
