##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_row_create_table : Bug#51574 Feb 27 2010 andrei failed different way than earlier with bug#45576
rpl_log_pos : BUG#55675 Sep 10 2010 27 2010 alfranio rpl.rpl_log_pos fails sporadically with error binlog truncated in the middle
rpl_get_master_version_and_clock : Bug#59178 Jan 05 2011 joro Valgrind warnings rpl_get_master_version_and_clock
