##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

galera_sequences : MDEV-32561 WSREP FSM failure: no such a transition REPLICATING -> COMMITTED
galera_as_slave_replay : MDEV-32780 galera_as_slave_replay: assertion in the wsrep::transaction::before_rollback()
galera_slave_replay : MDEV-32780 galera_as_slave_replay: assertion in the wsrep::transaction::before_rollback()
