##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

#
# instead of disabling innodb tests that are not fixed in xtradb yet
# add --skip inside if() into the test file itself
#

innodb_bug52745: Disabled as this has valgrind failures (also in MySQL 5.1.50)
