##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
user_limits : Bug#23921 random failure of user_limits.test
concurrent_innodb : BUG#21579 innodb_concurrent random failures with varying differences
