##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

#innodb_bug53756 : Waiting for merge with Percona Server; bug fixed in innodb_plugin in MySQL 5.1.50
innodb-lock:  Disabled until merging with XtraDB 5.1.60
innodb_replace:  Disabled until merging with XtraDB 5.1.60
