##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

innodb_scrub            : MDEV-8139 scrubbing does not work reliably
innodb_scrub_background : MDEV-8139 scrubbing does not work reliably
innodb-redo-badkey : MDEV-13893 / MDEV-12699 Improve crash recovery of corrupted data pages
innodb_encryption-page-compression : MDEV-14814 wait condition timeout
