##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_row_create_table : Bug#51574 Feb 27 2010 andrei failed different way than earlier with bug#45576
