##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

#innodb : Bug#53306 2010-04-30 VasilDimov valgrind warnings
innodb_bug53756 : Waiting for merge with Percona Server; bug fixed in innodb_plugin in MySQL 5.1.50
