# List of disabled tests
# test name : comment
rpl_redirect : Fails due to bug#49978
crash_manycolumns_string : Bug#50495 'Row size too large' for plugin, but works for built-in innodb
ix_unique_lob : Bug#52283 Innodb reports extra warnings when SELECT/WHERE is performed using invalid value
ix_unique_string_length : Bug#52283 Innodb reports extra warnings when SELECT/WHERE is performed using invalid value

