##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

restart : Not supported by MariaDB 10.2 2/9/2016 jplindst
innochecksum   : MDEV-10727 2/9/2016 jplindst 
innochecksum_2 : MDEV-10727 2/9/2016 jplindst
innochecksum_3 : MDEV-10727 2/9/2016 jplindst
wl6560 : MDEV_10727
