<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">##############################################################################
#
#  List the test cases that are to be disabled temporarely.
#
#  Separate the test case name and the comment with ':'.
#
#      &lt;testcasename&gt;  : Comment test
#
#  Don't use any TAB characters for whitespace.
#
##############################################################################

ndb_load        : Bug#17233
</pre></body></html>