insert_delayed   : MDEV-12880 - INSERT DELAYED is not detected as inapplicable to a table under lock
lock_concurrent  : MDEV-12882 - Assertion failure
select_high_prio : MDEV-12885 - MDL_SHARED_READ_ONLY is taken instead of MDL_SHARED_READ
