##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_redirect               : Failure is sporadic and and the test is superfluous (mats)
rpl_innodb_bug28430        : Failure on Solaris Bug #36793
rpl_server_id1             : Bug #36818 rpl_server_id1 fails expecting slave has stopped (azundris)
