##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
tablespace               : disabled in MariaDB (no TABLESPACE table attribute)
events_time_zone         : Test is not predictable as it depends on precise timing.
read_many_rows_innodb    : Bug#11748886 2010-11-15 mattiasj report already exists
mysql_embedded           : Bug#12561297 2011-05-14 Anitha Dependent on PB2 changes - eventum#41836
#show_explain  : Psergey: random timeout in range-checked-for-each record query.
ssl_crl_clients_valid    : broken upstream
ssl_crl                  : broken upstream
ssl_crl_clrpath          : broken upstream
file_contents            : MDEV-6526 these files are not installed anymore
max_statement_time       : cannot possibly work, depends on timing
partition_open_files_limit : open_files_limit check broken by MDEV-18360
