##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#      <testcasename>  : Comment test
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

sp-goto         : GOTO is currently is disabled - will be fixed in the future
rpl_bit_npk     : Bug #13418
ndb_cache2      : Bug #15004
ndb_cache_multi2: Bug #15004
func_group      : Bug #15448
func_math       : Bug #15448
group_min_max   : Bug #15448 
innodb_concurrent : Results are not deterministic, Elliot will fix (BUG#3300)
subselect       : Bug#15706
type_time       : Bug#15805
#rpl000002       : Bug#15920 Temporary tables are not binlogged in SBR
#ps_7ndb         : Bug#15923 Core dump in RBR mode when executing test suite
rpl_ddl         : Bug#15963 SBR does not show "Definer" correctly
mysqlslap       : Bug#16167
