##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
jp_convert_sjis      : Bug#36597 Testsuite "jp": Suspicious results for some tests
jp_select_sjis       : Bug#36597 Testsuite "jp": Suspicious results for some tests
